INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.528,
3.239,
-25.548,
-25.515,
3.238,
3.243,
NULL,
9,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.387,
3.258,
-24.401,
-24.381,
3.255,
3.263,
NULL,
8,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.239,
3.244,
-21.247,
-21.223,
3.242,
3.249,
NULL,
11,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.371,
3.265,
-21.383,
-21.361,
3.26,
3.267,
NULL,
6,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.123,
3.264,
-21.142,
-21.108,
3.262,
3.266,
NULL,
9,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.089,
3.284,
-22.101,
-22.083,
3.283,
3.286,
NULL,
10,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.091,
3.242,
-21.107,
-21.085,
3.239,
3.245,
NULL,
11,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.443,
3.297,
-22.455,
-22.427,
3.296,
3.301,
NULL,
11,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.402,
3.283,
-21.408,
-21.396,
3.282,
3.287,
NULL,
9,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.361,
3.285,
-22.381,
-22.346,
3.282,
3.289,
NULL,
9,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.599,
3.218,
-20.613,
-20.592,
3.214,
3.223,
NULL,
6,
'2026-06-12',
'2026-06-12 08:00:00',
'2026-06-12 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.597,
3.239,
-25.606,
-25.589,
3.237,
3.24,
NULL,
6,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.245,
3.256,
-24.256,
-24.238,
3.254,
3.258,
NULL,
8,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.325,
3.241,
-21.342,
-21.317,
3.238,
3.245,
NULL,
7,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.393,
3.259,
-21.402,
-21.387,
3.254,
3.26,
NULL,
8,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.165,
3.262,
-21.176,
-21.152,
3.259,
3.267,
NULL,
10,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.028,
3.282,
-22.033,
-22.017,
3.28,
3.283,
NULL,
7,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.032,
3.242,
-21.041,
-21.015,
3.239,
3.243,
NULL,
7,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.466,
3.299,
-22.475,
-22.458,
3.298,
3.3,
NULL,
10,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.403,
3.284,
-21.418,
-21.385,
3.28,
3.289,
NULL,
11,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.229,
3.282,
-22.234,
-22.223,
3.278,
3.285,
NULL,
11,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.659,
3.217,
-20.673,
-20.641,
3.216,
3.218,
NULL,
10,
'2026-06-13',
'2026-06-13 08:00:00',
'2026-06-13 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.551,
3.244,
-25.557,
-25.531,
3.242,
3.245,
NULL,
9,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.273,
3.263,
-24.281,
-24.254,
3.259,
3.268,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.221,
3.244,
-21.227,
-21.209,
3.241,
3.247,
NULL,
12,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.443,
3.256,
-21.463,
-21.436,
3.252,
3.261,
NULL,
11,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.165,
3.264,
-21.18,
-21.16,
3.262,
3.268,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.028,
3.276,
-22.042,
-22.009,
3.273,
3.281,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.031,
3.243,
-21.04,
-21.025,
3.241,
3.244,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.425,
3.297,
-22.434,
-22.407,
3.295,
3.302,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.391,
3.281,
-21.404,
-21.371,
3.277,
3.283,
NULL,
10,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.236,
3.275,
-22.241,
-22.228,
3.271,
3.278,
NULL,
8,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.617,
3.224,
-20.63,
-20.609,
3.22,
3.229,
NULL,
10,
'2026-06-14',
'2026-06-14 08:00:00',
'2026-06-14 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.585,
3.242,
-25.603,
-25.575,
3.237,
3.246,
NULL,
7,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.285,
3.258,
-24.302,
-24.271,
3.254,
3.263,
NULL,
11,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.311,
3.236,
-21.318,
-21.292,
3.233,
3.239,
NULL,
12,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.403,
3.262,
-21.409,
-21.384,
3.259,
3.267,
NULL,
7,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.11,
3.256,
-21.127,
-21.1,
3.254,
3.257,
NULL,
9,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.077,
3.283,
-22.093,
-22.064,
3.282,
3.285,
NULL,
11,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.013,
3.245,
-21.032,
-20.998,
3.24,
3.246,
NULL,
8,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.379,
3.299,
-22.399,
-22.369,
3.295,
3.303,
NULL,
11,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.42,
3.275,
-21.439,
-21.408,
3.274,
3.277,
NULL,
7,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.353,
3.285,
-22.368,
-22.346,
3.281,
3.288,
NULL,
12,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.637,
3.22,
-20.642,
-20.622,
3.218,
3.221,
NULL,
6,
'2026-06-15',
'2026-06-15 08:00:00',
'2026-06-15 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.487,
3.237,
-25.501,
-25.47,
3.235,
3.241,
NULL,
10,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.362,
3.262,
-24.367,
-24.343,
3.258,
3.265,
NULL,
8,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.286,
3.245,
-21.292,
-21.266,
3.242,
3.248,
NULL,
6,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.429,
3.263,
-21.445,
-21.412,
3.261,
3.268,
NULL,
6,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.138,
3.261,
-21.143,
-21.118,
3.257,
3.264,
NULL,
9,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.012,
3.284,
-22.019,
-21.994,
3.283,
3.289,
NULL,
7,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.038,
3.238,
-21.045,
-21.021,
3.234,
3.24,
NULL,
8,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.445,
3.298,
-22.465,
-22.434,
3.297,
3.302,
NULL,
7,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.368,
3.279,
-21.377,
-21.361,
3.274,
3.283,
NULL,
7,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.25,
3.279,
-22.265,
-22.238,
3.277,
3.28,
NULL,
6,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.597,
3.218,
-20.608,
-20.589,
3.215,
3.219,
NULL,
11,
'2026-06-16',
'2026-06-16 08:00:00',
'2026-06-16 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.481,
3.241,
-25.497,
-25.475,
3.24,
3.245,
NULL,
9,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.377,
3.263,
-24.386,
-24.36,
3.262,
3.267,
NULL,
8,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.31,
3.239,
-21.325,
-21.297,
3.237,
3.242,
NULL,
6,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.448,
3.258,
-21.467,
-21.433,
3.253,
3.26,
NULL,
8,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.205,
3.256,
-21.22,
-21.186,
3.254,
3.259,
NULL,
10,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-21.998,
3.278,
-22.005,
-21.982,
3.275,
3.281,
NULL,
10,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.015,
3.236,
-21.024,
-20.997,
3.234,
3.241,
NULL,
11,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.442,
3.298,
-22.448,
-22.424,
3.293,
3.302,
NULL,
7,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.384,
3.278,
-21.404,
-21.366,
3.274,
3.283,
NULL,
11,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.352,
3.28,
-22.361,
-22.345,
3.278,
3.284,
NULL,
11,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.532,
3.218,
-20.541,
-20.513,
3.216,
3.222,
NULL,
9,
'2026-06-17',
'2026-06-17 08:00:00',
'2026-06-17 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.545,
3.24,
-25.565,
-25.531,
3.236,
3.243,
NULL,
7,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.254,
3.259,
-24.262,
-24.237,
3.254,
3.264,
NULL,
11,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.33,
3.243,
-21.349,
-21.315,
3.24,
3.247,
NULL,
10,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.45,
3.262,
-21.464,
-21.441,
3.26,
3.263,
NULL,
8,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.111,
3.256,
-21.117,
-21.098,
3.255,
3.261,
NULL,
6,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.044,
3.279,
-22.061,
-22.025,
3.277,
3.284,
NULL,
11,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-21.09,
3.236,
-21.104,
-21.075,
3.231,
3.237,
NULL,
11,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.449,
3.304,
-22.465,
-22.441,
3.299,
3.309,
NULL,
8,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.479,
3.279,
-21.485,
-21.465,
3.276,
3.282,
NULL,
9,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.263,
3.285,
-22.278,
-22.246,
3.282,
3.288,
NULL,
6,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.61,
3.222,
-20.617,
-20.592,
3.217,
3.224,
NULL,
12,
'2026-06-18',
'2026-06-18 08:00:00',
'2026-06-18 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00addd35',
'ARTINI',
-25.562,
3.243,
-25.571,
-25.543,
3.239,
3.245,
NULL,
10,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'VSOL00ad1105',
'SATRIA PERUM PANGGUNG',
-24.398,
3.265,
-24.414,
-24.389,
3.26,
3.27,
NULL,
10,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90adda0',
'RIDA AGUS',
-21.173,
3.239,
-21.192,
-21.159,
3.235,
3.242,
NULL,
6,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90add88',
'SMP 6 SITUBONDO',
-21.405,
3.264,
-21.425,
-21.386,
3.259,
3.267,
NULL,
7,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaf00',
'BASRIYADI',
-21.203,
3.261,
-21.22,
-21.187,
3.257,
3.264,
NULL,
10,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCd1b3aa28',
'IRWAN',
-22.152,
3.278,
-22.163,
-22.136,
3.275,
3.28,
NULL,
11,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90a4760',
'TEGUH ADI',
-20.959,
3.238,
-20.978,
-20.95,
3.236,
3.241,
NULL,
6,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'CDTCaf8e7bf1',
'MALD/H1/1/3/13',
-22.401,
3.298,
-22.414,
-22.383,
3.294,
3.3,
NULL,
9,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aaed8',
'FENTI',
-21.505,
3.282,
-21.512,
-21.492,
3.278,
3.285,
NULL,
12,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90aabf8',
'DESY/SUPARJO',
-22.328,
3.284,
-22.348,
-22.318,
3.279,
3.287,
NULL,
9,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

INSERT INTO onu_daily_history
(sn, ont_name, rx_power, voltage, min_rx, max_rx, min_voltage, max_voltage, last_cause, sample_count, log_date, created_at, updated_at)
VALUES
(
'HWTCa90addb0',
'AYANG',
-20.558,
3.217,
-20.563,
-20.541,
3.216,
3.222,
NULL,
6,
'2026-06-19',
'2026-06-19 08:00:00',
'2026-06-19 17:00:00'
);

